
.?  help in main menu

   This program is used to Edit, Compile, Link and Run
	   PASCAL-XSC programs.

   Enter the letter "h" to enter the help menu or
   Enter the letter "q" to leave this program.

.Display   Main menu

PASCAL-XSC to C   Development System             Commands are:

  E =   Enter the Editor
  C =   Compile a PASCAL-XSC program
  M =   Make a PASCAL-XSC program
  L =   edit a Listing file
  P =   Print a file
  R =   Run a PASCAL-XSC program
  F =   Change the file to work on
  Y =   sYstem call
  D =   toggle  DISPLAY MAIN MENU
  H =   Help menu
  Q =   Quit (leave) the PASCAL-XSC development system

.Help      help in submenu

			      ****************
			      * Help submenu *
			      ****************
    Read the output of the help menu carefully and answer the prompt in the
    cursor line.
Enter "f" for help on changing the current file.
Enter "e" for help on editing the current file.
Enter "c" for help on compiling the current file.
Enter "m" for help on compiling and linking the current file.
Enter "r" for help on running the compiled program.
Enter "l" for help on editing the listing file.
Enter "p" for help on printing the current file.
Enter "y" for help on system calls.
Enter "d" for help on toggling the "display main menu".
Enter "h" for help on the help feature.
Enter "q" for help on leaving this program.


.Filename

  You are going to change the name of the file to be
  edited, compiled and run.

  Enter the letter "p"  to switch to a main program or
	the letter "m"  to switch to a module or
	the letter "o"  to switch to an other file or
	a digit         to switch to a stored filename
	the letter "n"  followed by a new filename or
	the letter "h"  to display this help or
	the letter "q"  to leave the FILENAME command without change
  ending with RETURN.

.filename

  The FILENAME command changes the name of the file to be
  edited, compiled and run.

  Enter the letter "f" followed by
	the letter "p"  to switch to a main program or
	the letter "m"  to switch to a module or
	the letter "o"  to switch to an other file or
	a digit         to switch to a file, already specified
	the letter "n"  followed by a new filename or
	the letter "h"  to display help on the FILENAME command or
	the letter "q"  to leave the FILENAME command without change
  ending with RETURN.

.edit

  The EDIT command enters the editor to edit the current file or a
  specified file.

  Enter the letter "e" and hit RETURN   or
  Enter the letter "e" followed a filename and hit RETURN.

.print

  The PRINT command prints the current file on a line printer.

  Enter the letter "p" and hit RETURN.

.compile

  The COMPILE command starts the PASCAL-XSC compiler, the C compiler and
  the linker.

  Enter the letter "c" and hit RETURN.

.make

  The MAKE command starts the PASCAL-XSC compiler, the C compiler and
  the linker.

  Enter the letter "m" and hit RETURN.

.run

  The RUN command starts the PASCAL-XSC program of the file specified
  by the FILE command.

  Enter the letter "r" followed by the program parameters.
  If you enter only the letter "r" followed by the RETURN key, you are
     requested to enter the program parameters.
  If you do not want to specify program parameters, just hit the RETURN key
     twice.

  Enter "rr" followed by the RETURN key to rerun the program with the
     program parameters specified in the previous RUN command.

.list

  The LISTING command allows you to edit the listing file and creates a new
  pascal source file from the listing file.

  The listing file contains error messages of the PASCAL-XSC compiler and the
  pascal source lines.
  All lines starting with "!" are message line and will be deleted
     automatically after leaving the editor.
  All other lines are pascal source lines. Pascal source lines must not start
     with "!".

  Enter the letter "l" and hit RETURN.

.ystem

  The SYSTEM command executes a system command or enters a system shell.

  Enter the letter "y" followed by the system command to execute the
     command.
  Enter the letter "y" followed by the RETURN key only to enter a system
     shell.

.display

  The DISPLAY command toggles the "display main menu" switch.

      If the main menu appears automatically,
  Enter the letter "d" and hit RETURN to suppress the main menu
       and the "Hit RETURN to continue" prompt.

      If the main menu does not appear,
  Enter the letter "d" and hit RETURN to display the main menu

.help

  The HELP command gives online help.

  You may type the letter "h" followed by the RETURN key to display the
  help menu or
  you may type "h" followed by a command letter to display help on
  the command. This mode suppresses the help menu.

.quit

  The QUIT command "q" stops this program.

..
